%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{ThiruvottriyurShanmugam_etal2024} {\textquotedblleft}\textit{A 96-well LED array for multiplexed photoelectrochemical detection of nucleic acids}{\textquotedblright}. Thiruvottriyur Shanmugam S, Steijlen A, Laurijssen D, Campos R, Steckel J, Daems W, Bassini S, Daems E, De Wael K, Analytical chemistry \textbf{96}, 15091 (2024).   http://doi.org/10.1021/ACS.ANALCHEM.4C01998

\end{thebibliography}

\end{document}

