%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Bampouli_etal2024} {\textquotedblleft}\textit{Importance of design and operating parameters in a sonication system for viscous solutions : effects of input power, horn tip diameter and reactor capacity}{\textquotedblright}. Bampouli A, Goris Q, Hussain MN, Louisnard O, Stefanidis GD, Van Gerven T, Chemical engineering and processing \textbf{198}, 109715 (2024).   http://doi.org/10.1016/J.CEP.2024.109715

\end{thebibliography}

\end{document}

