%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Truta_etal2023} {\textquotedblleft}\textit{NanoMIPs-based electrochemical sensors for selective detection of amphetamine}{\textquotedblright}. Truta F, Cruz AG, Tertis M, Zaleski C, Adamu G, Allcock NS, Suciu M, Stefan M-G, Kiss B, Piletska E, De Wael K, Piletsky SA, Cristea C, Microchemical journal \textbf{191}, 108821 (2023).   http://doi.org/10.1016/J.MICROC.2023.108821

\end{thebibliography}

\end{document}

