%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{deGendt_etal1995} {\textquotedblleft}\textit{Parameter evaluation for the analysis of oxide-based samples with radio ferquency glow discharge mass spectrometry}{\textquotedblright}. de Gendt S, Van Grieken RE, Ohorodnik SK, Harrison WW, Analytical chemistry \textbf{67}, 1026 (1995).   http://doi.org/10.1021/AC00102A002

\end{thebibliography}

\end{document}

