%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Jain_etal2010} {\textquotedblleft}\textit{Highly sensitive and selective voltammetric sensor fullerene modified glassy carbon electrode for determination of cefitizoxime in solubilized system}{\textquotedblright}. Jain R, Rather JA, Dwivedi A, Vikas, Electroanalysis \textbf{22}, 2600 (2010).   http://doi.org/10.1002/ELAN.201000243

\end{thebibliography}

\end{document}

