%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Blidar_etal2020} {\textquotedblleft}\textit{Enhanced photoelectrochemical detection of an analyte triggered by its concentration by a singlet oxygen-generating fluoro photosensitizer}{\textquotedblright}. Blidar A, Trashin S, Carrion EN, Gorun SM, Cristea C, De Wael K, Acs Sensors \textbf{5}, 3501 (2020).   http://doi.org/10.1021/ACSSENSORS.0C01609

\end{thebibliography}

\end{document}

