%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Somogyi_etal2003} {\textquotedblleft}\textit{Effects of beamline components (undulators, monochromator, focusing devices) on the beam intensity at ID18F (ESRF)}{\textquotedblright}. Somogyi A, Drakopoulos M, Vekemans B, Vincze L, Simionovici AS, Adams F, Nuclear instruments and methods: B \textbf{199}, 559 (2003).   http://doi.org/10.1016/S0168-583X(02)01535-5

\end{thebibliography}

\end{document}

