%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Moro_etal2020} {\textquotedblleft}\textit{Unlocking the full power of electrochemical fingerprinting for on-site sensing applications}{\textquotedblright}. Moro G, Barich H, Driesen K, Montiel NF, Neven L, Mendonca CD, Thiruvottriyur Shanmugam S, Daems E, De Wael K, Analytical And Bioanalytical Chemistry , 1 (2020).   http://doi.org/10.1007/S00216-020-02584-X

\end{thebibliography}

\end{document}

