%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Amiri-Aref_etal2015} {\textquotedblleft}\textit{Mixed hemi/ad-micelles coated magnetic nanoparticles for the entrapment of hemoglobin at the surface of a screen-printed carbon electrode and its direct electrochemistry and electrocatalysis}{\textquotedblright}. Amiri-Aref M, Raoof JB, Kiekens F, De Wael K, Biosensors and bioelectronics \textbf{74}, 518 (2015).   http://doi.org/10.1016/J.BIOS.2015.07.001

\end{thebibliography}

\end{document}

