%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Vincze_etal1998} {\textquotedblleft}\textit{Interpretation of cappilary generated spatial and angular distribution of X-rays: theoretical modeling and experimental verification using the European Synchrotron Radiation Facility Optical Beamline}{\textquotedblright}. Vincze L, Janssens K, Adams F, Engstr{\"o}m P, Rindby A, The review of scientific instruments \textbf{69}, 3494 (1998).   http://doi.org/10.1063/1.1149127

\end{thebibliography}

\end{document}

