%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Bogaerts_etal2002} {\textquotedblleft}\textit{Calculation of the gas flow and its effect on the plasma characteristics for a modified Grimm-type glow discharge cell}{\textquotedblright}. Bogaerts A, Okhrimovskyy A, Gijbels R, Journal of analytical atomic spectrometry \textbf{17}, 1076 (2002).   http://doi.org/10.1039/b200746k

\end{thebibliography}

\end{document}

