%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Montoya_etal2007} {\textquotedblleft}\textit{Evaluation of top, angle, and side cleaned FIB samples for TEM analysis}{\textquotedblright}. Montoya E, Bals S, Rossell MD, Schryvers D, Van Tendeloo G, Microscopy research and technique \textbf{70}, 1060 (2007).   http://doi.org/10.1002/jemt.20514

\end{thebibliography}

\end{document}

