%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Liu_etal2023} {\textquotedblleft}\textit{Optical spectrum of n-type and p-type monolayer MoS$_{2}$ in the presence of proximity-induced interactions}{\textquotedblright}. Liu J, Xu W, Xiao YM, Ding L, Li HW, Peeters FM, Journal of applied physics \textbf{134}, 224301 (2023).   http://doi.org/10.1063/5.0181003

\end{thebibliography}

\end{document}

