%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Schram_etal2022} {\textquotedblleft}\textit{Paraformaldehyde-coated electrochemical sensor for improved on-site detection of amphetamine in street samples}{\textquotedblright}. Schram J, Parrilla M, Slosse A, Van Durme F, {\r A}berg J, Bj{\"o}rk K, Bijvoets SM, Sap S, Heerschop MWJ, De Wael K, Microchemical journal \textbf{179}, 107518 (2022).   http://doi.org/10.1016/J.MICROC.2022.107518

\end{thebibliography}

\end{document}

