%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Dragan_etal2023} {\textquotedblleft}\textit{Microneedle array-based electrochemical sensor functionalized with SWCNTs for the highly sensitive monitoring of MDMA in interstitial fluid}{\textquotedblright}. Dr{\u a}gan A-M, Parrilla M, Cambr{\'e} S, Dom{\'\i}nguez-Robles J, Detamornrat U, Donnelly RF, Oprean R, Cristea C, De Wael K, Microchemical journal \textbf{193}, 109257 (2023).   http://doi.org/10.1016/J.MICROC.2023.109257

\end{thebibliography}

\end{document}

