%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Campos_etal2023} {\textquotedblleft}\textit{Development of an electrochemiluminescent oligonucleotide-based assay for the quantification of prostate cancer associated miR-141-3p in human serum}{\textquotedblright}. Campos R, Thiruvottriyur Shanmugam S, Daems E, Ribeiro R, De Wael K, Bioelectrochemistry: an international journal devoted to electrochemical aspects of biology and biological aspects of electrochemistry \textbf{153}, 108495 (2023).   http://doi.org/10.1016/J.BIOELECHEM.2023.108495

\end{thebibliography}

\end{document}

