%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Milovanovic+Peeters2018} {\textquotedblleft}\textit{Strained graphene structures : from valleytronics to pressure sensing}{\textquotedblright}. Milovanovi{\'c} SP, Peeters FM, Nanostructured Materials For The Detection Of Cbrn , 3 (2018).   http://doi.org/10.1007/978-94-024-1304-5_1

\end{thebibliography}

\end{document}

