%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Aghaei_etal2013} {\textquotedblleft}\textit{The effect of the sampling cone position and diameter on the gas flow dynamics in an ICP}{\textquotedblright}. Aghaei M, Lindner H, Bogaerts A, Journal of analytical atomic spectrometry \textbf{28}, 1485 (2013).   http://doi.org/10.1039/c3ja50107h

\end{thebibliography}

\end{document}

