%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Abreu_etal2011} {\textquotedblleft}\textit{Multiscale modeling of radiation damage and annealing in Si samples implanted with 57-Mn radioactive ions}{\textquotedblright}. Abreu Y, Cruz CM, van Espen P, Pi{\~n}era I, Leyva A, Cabal AE, IEEE conference record
T2 -- IEEE Nuclear Science Symposium/Medical Imaging Conference (NSS/MIC)/18th, International Workshop on Room-Temperature Semiconductor X-Ray and, Gamma-Ray Detectors, OCT 23-29, 2011, Valencia, SPAIN , 1754 (2011)

\end{thebibliography}

\end{document}

