%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{vandeVijver_etal1984} van de Vijver FL, Verbueken AH, Visser WJ, Van Grieken RE, de Broe ME (1984) Localisation of aluminium and iron by histochemical and laster microprobe mass analytical techniques in bone marrow cells of chronic hemodialysis patients. 837--838

\end{thebibliography}

\end{document}

