%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Wang_etal2013} {\textquotedblleft}\textit{Effect of annealing on the transformation behavior and mechanical properties of two nanostructured Ti-50.8at.\%Ni thin wires produced by different methods}{\textquotedblright}. Wang X, Amin-Ahmadi B, Schryvers D, Verlinden B, Van Humbeeck J, Materials science forum \textbf{738/739}, 306 (2013).   http://doi.org/10.4028/www.scientific.net/MSF.738-739.306

\end{thebibliography}

\end{document}

