%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Wiorek_etal2020} {\textquotedblleft}\textit{Epidermal patch with glucose biosensor : pH and temperature correction toward more accurate sweat analysis during sport practice}{\textquotedblright}. Wiorek A, Parrilla M, Cuartero M, Crespo GA, Analytical Chemistry \textbf{92}, 10153 (2020).   http://doi.org/10.1021/ACS.ANALCHEM.0C02211

\end{thebibliography}

\end{document}

