%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Chernozem_etal2021} {\textquotedblleft}\textit{Enhanced piezoresponse and surface electric potential of hybrid biodegradable polyhydroxybutyrate scaffolds functionalized with reduced graphene oxide for tissue engineering}{\textquotedblright}. Chernozem R V, Romanyuk KN, Grubova I, Chernozem P V, Surmeneva MA, Mukhortova YR, Wilhelm M, Ludwig T, Mathur S, Kholkin AL, Neyts E, Parakhonskiy B, Skirtach AG, Surmenev RA, Nano Energy \textbf{89}, 106473 (2021).   http://doi.org/10.1016/J.NANOEN.2021.106473

\end{thebibliography}

\end{document}

