%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Aghaei_etal2012} {\textquotedblleft}\textit{Effect of a mass spectrometer interface on inductively coupled plasma characteristics : a computational study}{\textquotedblright}. Aghaei M, Lindner H, Bogaerts A, Journal of analytical atomic spectrometry \textbf{27}, 604 (2012).   http://doi.org/10.1039/c2ja10341a

\end{thebibliography}

\end{document}

