%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Alfeld2013} Alfeld MW (2013) Development of scanning macr-XRF for the investigation of historical paintings. 264 p

\end{thebibliography}

\end{document}

