%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Mescia_etal2019} {\textquotedblleft}\textit{Design of electroporation process in irregularly shaped multicellular systems}{\textquotedblright}. Mescia L, Chiapperino MA, Bia P, Lamacchia CM, Gielis J, Caratelli D, Electronics (Basel) \textbf{8}, 37 (2019).   http://doi.org/10.3390/ELECTRONICS8010037

\end{thebibliography}

\end{document}

