%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Bencs_etal2007} {\textquotedblleft}\textit{Comparison of hot-air and low-radiant pew heating systems on the distribution and transport of gaseous air pollutants in the mountain church of Rocca Pietore from artwork conservation points of view}{\textquotedblright}. Bencs L, Spolnik Z, Limpens-Neilen D, Schellen HL, J{\"u}tte BAHG, Van Grieken R, Journal of cultural heritage \textbf{8}, 264 (2007).   http://doi.org/10.1016/J.CULHER.2007.05.001

\end{thebibliography}

\end{document}

