%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Cui_etal2022} {\textquotedblleft}\textit{SF$_{6}$ catalytic degradation in a γ-Al$_{2}$O$_{3}$ packed bed plasma system : a combined experimental and theoretical study}{\textquotedblright}. Cui Z, Zhou C, Jafarzadeh A, Meng S, Yi Y, Wang Y, Zhang X, Hao Y, Li L, Bogaerts A, High voltage , 1 (2022).   http://doi.org/10.1049/HVE2.12230

\end{thebibliography}

\end{document}

