%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{VegaIbanez_etal2022} {\textquotedblleft}\textit{Can a programmable phase plate serve as an aberration corrector in the transmission electron microscope (TEM)?}{\textquotedblright}.Vega Iba{\~n}ez F, B{\'e}ch{\'e} A, Verbeeck J, Microscopy and microanalysis , Pii S1431927622012260 (2022).   http://doi.org/10.1017/S1431927622012260

\end{thebibliography}

\end{document}

