%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Gogoi_etal2022} {\textquotedblleft}\textit{Arresting aqueous swelling of layered graphene-oxide membranes with H$_{3}$O$^{+}$ and OH$^{-}$ ions}{\textquotedblright}. Gogoi A, Neyts EC, Milo{\v s}evi{\'c} MV, Peeters FM, ACS applied materials and interfaces \textbf{14}, 34946 (2022).   http://doi.org/10.1021/ACSAMI.2C05926

\end{thebibliography}

\end{document}

