%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Gorle_etal2014} {\textquotedblleft}\textit{The deviation from parallel shear flow as an indicator of linear eddy-viscosity model inaccuracy}{\textquotedblright}. Gorl{\'e} C, Larsson J, Emory M, Iaccarino G, Physics of fluids \textbf{26}, 051702 (2014).   http://doi.org/10.1063/1.4876577

\end{thebibliography}

\end{document}

