%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Cagno_etal2020} {\textquotedblleft}\textit{Comparison of four mobile, non-invasive diagnostic techniques for differentiating glass types in historical leaded windows : MA-XRF , UV{\textendash}Vis{\textendash}NIR, Raman spectroscopy and IRT}{\textquotedblright}. Cagno S, van der Snickt G, Legrand S, Caen J, Patin M, Meulebroeck W, Dirkx Y, Hillen M, Steenackers G, Rousaki A, Vandenabeele P, Janssens K, X-Ray Spectrometry , xrs.3185 (2020).   http://doi.org/10.1002/XRS.3185

\end{thebibliography}

\end{document}

