%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Cautaerts_etal2020} Cautaerts N, Lamm S, Stergar E, Pakarinen J, Yang Y, Hofer C, Schnitzer R, Felfer P, Verwerft M, Delville R, Schryvers D (2020) Atom probe tomography data collection from DIN 1.4970 (15-15Ti) austenitic stainless steel irradiated with Fe ions

\end{thebibliography}

\end{document}

