%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Janssens_etal1996} {\textquotedblleft}\textit{Synchrotron radiation induced X-ray microfluorescence analysis}{\textquotedblright}. Janssens K, Vincze L, Vekemans B, Aerts A, Adams F, Jones KW, Kn{\"o}chel A, Microchimica acta
T2 -- 4th Workshop of the European-Microanalysis-Society on Modern, Developments and Applications in Microbeam Analysis, MAY, 1995, ST MALO, FRANCE , 87 (1996)

\end{thebibliography}

\end{document}

