%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Vincze_etal2002} {\textquotedblleft}\textit{Suitability of polycapillary optics for focusing of monochromatic synchrotron radiation as used in trace level micro-XANES measurements}{\textquotedblright}. Vincze L, Wei F, Proost K, Vekemans B, Janssens K, He Y, Yan Y, Falkenberg G, Journal of analytical atomic spectrometry \textbf{17}, 177 (2002).   http://doi.org/10.1039/B110210A

\end{thebibliography}

\end{document}

