%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Vincze_etal1998} {\textquotedblleft}\textit{Optimization of tapered capillary optics for use at the microfocus beamline (ID 13) at the European Synchroton Radiation Facility}{\textquotedblright}. Vincze L, Janssens K, Adams F, Rindby A, Engstr{\"o}m P, Advances in X-ray analysis \textbf{41}, 252 (1998)

\end{thebibliography}

\end{document}

