%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Rahemi_etal2019} {\textquotedblleft}\textit{Enzymatic sensor for phenols based on titanium dioxide generating surface confined ROS after treatment with H$_{2}$O$_{2}$}{\textquotedblright}. Rahemi V, Trashin S, Hafideddine Z, Meynen V, Van Doorslaer S, De Wael K, Sensors and actuators : B : chemical \textbf{283}, 343 (2019).   http://doi.org/10.1016/J.SNB.2018.12.039

\end{thebibliography}

\end{document}

