%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Mueller-Caspary_etal2019} {\textquotedblleft}\textit{Comparison of first moment STEM with conventional differential phase contrast and the dependence on electron dose}{\textquotedblright}. M{\"u}ller-Caspary K, Krause FF, Winkler F, B{\'e}ch{\'e} A, Verbeeck J, Van Aert S, Rosenauer A, Ultramicroscopy \textbf{203}, 95 (2019).   http://doi.org/10.1016/J.ULTRAMIC.2018.12.018

\end{thebibliography}

\end{document}

