%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Bekeschus_etal2018} {\textquotedblleft}\textit{A comparison of floating-electrode DBD and kINPen jet : plasma parameters to achieve similar growth reduction in colon cancer cells under standardized conditions}{\textquotedblright}. Bekeschus S, Lin A, Fridman A, Wende K, Weltmann K-D, Miller V, Plasma chemistry and plasma processing \textbf{38}, 1 (2018).   http://doi.org/10.1007/S11090-017-9845-3

\end{thebibliography}

\end{document}

