%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Wang_etal2018} {\textquotedblleft}\textit{Modelling of plasma-based dry reforming: how do uncertainties in the input data affect the calculation results?}{\textquotedblright}.Wang W, Berthelot A, Zhang Q, Bogaerts A, Journal of physics: D: applied physics \textbf{51}, 204003 (2018).   http://doi.org/10.1088/1361-6463/aab97a

\end{thebibliography}

\end{document}

