%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Esquivel_etal2017} {\textquotedblleft}\textit{Thiol-ethylene bridged PMO: A high capacity regenerable mercury adsorbent via intrapore mercury thiolate crystal formation}{\textquotedblright}. Esquivel D, Ouwehand J, Meledina M, Turner S, Tendeloo GV, Romero-Salguero FJ, Clercq JD, Voort PVD, Journal of hazardous materials \textbf{339}, 368 (2017).   http://doi.org/10.1016/j.jhazmat.2017.06.051

\end{thebibliography}

\end{document}

