%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Lindner_etal2011} {\textquotedblleft}\textit{Simulation and experimental studies on plasma temperature, flow velocity, and injector diameter effects for an inductively coupled plasma}{\textquotedblright}. Lindner H, Murtazin A, Groh S, Niemax K, Bogaerts A, Analytical chemistry \textbf{83}, 9260 (2011).   http://doi.org/10.1021/ac201699q

\end{thebibliography}

\end{document}

