%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Cornelissens+Peeters2002} {\textquotedblleft}\textit{Response function of a Hall magnetosensor in the diffusive regime}{\textquotedblright}. Cornelissens YG, Peeters FM, Journal of applied physics \textbf{92}, 2006 (2002).   http://doi.org/10.1063/1.1487909

\end{thebibliography}

\end{document}

