%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Khalil-Allafi_etal2010} {\textquotedblleft}\textit{Biocompatibility and corrosion behavior of the shape memory NiTi alloy in the physiological environments simulated with body fluids for medical applications}{\textquotedblright}. Khalil-Allafi J, Amin-Ahmadi B, Zare M, Materials science and engineering: part C: biomimetic materials \textbf{30}, 1112 (2010).   http://doi.org/10.1016/j.msec.2010.06.007

\end{thebibliography}

\end{document}

