%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Hai_etal1993} {\textquotedblleft}\textit{Interface optical phonon mode coupling in GaAs/AlAs quantum wells at high magnetic fields}{\textquotedblright}. Hai GQ, Peeters FM, Devreese JT, Physica: B : condensed matter \textbf{184}, 289 (1993).   http://doi.org/10.1016/0921-4526(93)90367-F

\end{thebibliography}

\end{document}

