%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Smets_etal2014} {\textquotedblleft}\textit{InGaAs tunnel diodes for the calibration of semi-classical and quantum mechanical band-to-band tunneling models}{\textquotedblright}.  Smets Q, Verreck D, Verhulst AS, Rooyackers R, Merckling C, Van De Put M, Simoen E, Vandervorst W, Collaert N, Thean VY, Sor{\'e}e B, Groeseneken G, Heyns MM;, Journal of applied physics \textbf{115}, 184503 (2014).   http://doi.org/10.1063/1.4875535

\end{thebibliography}

\end{document}

