%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Bogaerts_etal2001} {\textquotedblleft}\textit{Improved hybrid Monte Carlo-fluid model for the electrical characteristics in an analytical radiofrequency glow discharge in argon}{\textquotedblright}. Bogaerts A, Gijbels R, Goedheer W, Journal of analytical atomic spectrometry \textbf{16}, 750 (2001).   http://doi.org/10.1039/b103768b

\end{thebibliography}

\end{document}

